

Help for Checking for viruses 
-----------------------------

The Checking for viruses pop-up window is displayed when IBM
AntiVirus/DOS is checking your system for viruses. A progress bar shows
the percentage of which the check is complete. The name of the current
file being checked is displayed. When checking is complete, you see a
display indicating whether or not a virus has been found. If a virus is
found, you will be given the option to remove the virus. 


Help for Stop 
_____________

Use the Stop push button to end this check. You are asked to confirm the
stop request. If you confirm by selecting Yes, checking will stop, and
the log will be updated for the checks that have been completed. Checking
stops after the current file is finished so there might be a slight
delay. If an indication of a virus has been detected the Virus infection
report pop-up window will be displayed. 
